\typeout{-------- references ------------}


\begin{thebibliography}{99}

%\bibitem{R1}   Receiver tests during the August 1992 period\\
%     M. Carter, J.Y. Chenu, H. Hein, S. Navarro, A. Greve, M. Gu\'elin
%(Sept 92)

\bibitem{R2}   Appendix I: Error beam and side lobes of the 30 m
telescope at 1.3 mm, 2 mm and 3 mm wavelength, in  ``Molecular Spiral
Structure in Messier 51'',\\
S. Garcia-Burillo, M. Gu\'elin, J. Cernicharo
1993,  Astron. Astrophys. {\bf 274}, 144-146.

\bibitem{R3}   A Small Users' Guide to NOD2 at the 30m telescope A.
Sievers (Feb. 1993)

%\bibitem{R4}   Thermal behaviour of mm-wavelength radio telescopes
%\\ A. Greve, M. Dan, J. Pe\~{n}alver %1992 (IRAM report 233)
%1993, IEEE Trans. Ant. Propag. AP--40, 1375

%\bibitem{R5}   Interferometric measurement of tropospheric phase
%fluctuations at 86 GHz\\ L. Olmi, D. Downes 1992 (IRAM report 238)

%\bibitem{R6}   Thermal design and thermal behaviour of Radio
%Telescope structures\\ A. Greve 1992 (IRAM report 253)

\bibitem{R7}   Astigmatism in reflector antennas: measurement and
correction\\ A. Greve, B. Lefloch, D. Morris, H. Hein, S. Navarro
%1993 (IRAM report 289)
1994, IEEE Trans. Ant. Propag. AP--42, 1345

%\bibitem{R8}   Design parameters and measured performance of the
%IRAM 30m millimeter radio telescope\\ J. Baars, A. Greve, H. Hein, D.
%Morris, J. Pe\~{n}alver, C. Thum %1993 (IRAM report 298).
%1993, Proc. IEEE~82, 687

\bibitem{R9}
\htmladdnormallink{Frequency switching at the 30m telescope}
{\wwwes/otherDocuments/manuals/Report/}
\\ C. Thum, A. Sievers,
S. Navarro, W. Brunswig, J. Pe\~nalver 1995, IRAM Tech. Report 228/95.
\\(\wwwes/\-otherDocuments/\-manuals/\-Report/fsw\_doc.ps)

\bibitem{R10} Cookbook formulae for estimating observing times at the
30m telescope
\\ M.~Gu\'elin, C.~Kramer, and W.~Wild\\
(\htmladdnormallink{IRAM Newsletter January 1995}
{\www/ARN/jan95/jan95.html})

\bibitem{R11} The 30m Manual: A Handbook for the 30m Telescope
(version~2), W.~Wild 1995
\\IRAM Tech. Report~377/95,\\
also available from the 
\htmladdnormallink{30m web site.}
{\wwwes/otherDocuments/manuals/manual_v20.ps}

%\bibitem{R12} NIC: Bolometer User's Guide
%\\D. Brogui\`ere, R. Neri, A. Sievers, and H.~Wiesemeyer 2000,
%IRAM Technical Report
%(\htmladdnormallink{../IRAMFR/\-GILDAS/\-doc/\-html/\-nic-html/\-nic.html}
%{\www/IRAMFR/\-GILDAS/\-doc/\-html/\-nic-html/\-nic.html});\\
%\mbox{see also the \htmladdnormallink{GILDAS home page}
%                  {/IRAMFR/\-GILDAS/}  at}
%/IRAMFR/\-GILDAS/ with further relevant technical reports.

\bibitem{R13} Pocket Cookbook for MOPSI software
%\\\mbox{R. Zylka 1996, available at}
\\R. Zylka 1996, available from the\hfill
\htmladdnormallink
%{../IRAMES/otherDocuments/manuals/ \\Datared/pockcoo.ps}
{30m web site.}
{\wwwes/\-otherDocuments/\-manuals/\-Datared/pockcoo.ps}.

\bibitem{Mauer} Line Calibrators at $\lambda =$ 1.3, 2, and 3mm.
\\R.~Mauersberger, M.~Gu\'elin, J.~Mart{\'\i}n--Pintado, C.~Thum,
J.~Cernicharo, H.~Hein, and S.Navarro 1989, A\&A Suppl. 79, 217

\bibitem{pointing} The Pointing of the IRAM 30m Telescope
\\A.~Greve, J.--F.~Panis, and C.~Thum 1996,
A\&A Suppl. 115, 379

\bibitem{g/e} The gain--elevation correction of the IRAM 30m Telescope
\\A.~Greve, R.~Neri, and A.~Sievers 1998,
A\&A Suppl. 132, 413

\bibitem{beam} The beam pattern of the IRAM 30m Telescope
\\A.~Greve, C.~Kramer, and W.~Wild 1998,
A\&A Suppl. 133, 271

\bibitem{TE2} A Time Estimator for Observations at the IRAM 30m Telescope,
D.~Teyssier 1999, IRAM/Granada Technical Note
(\wwwes/\-obstime/\-time\_estimator.html)

\bibitem{vespasummary} Short guide to VESPA \\
G.~Paubert\\
%\\IRAM Newsletter No.~54, 6
%\\(\wwwfr/veleta.htm  and
\htmladdnormallink
{\wwwes\-/otherDocuments\-/manuals/\-vespa\_ug.ps}
{\wwwes/otherDocuments/manuals/vespa_ug.ps}

\bibitem{astigmatism} First results from the IRAM 30m telescope
improved thermal control system
\\J.~Pe\~{n}alver, A.~Greve, and M.~Bremer 2002, IRAM Newsletter No.~54, 8

\bibitem{IFpol}A Versatile IF Polarimeter at the IRAM 30m Telescope\\
     C.~Thum, H.~Wiesemeyer, D.~Morris, S.~Navarro, and M.~Torres\\
     in ``Polarimetry in Astronomy'', Ed. S.Fineschi,
     \htmladdnormallink{Proc.of SPIE Vol.4843, 272--283 (2003)}
                       {http://www.iram.fr/\tilde{}thum/spie.ps.gz}

\bibitem{XPOL} XPOL -- the correlation polarimeter at the IRAM 30m telescope\\
	Thum, C., Wiesemeyer, H., Paubert, G., Navarro, S., and  Morris, D.\\
        \htmladdnormallink{PASP 120, 777 (2008)}
                    {http://adsabs.harvard.edu/abs/2008PASP..120..777T}

\end{thebibliography}


These reports are available upon request (see also previous
Newsletters). Please write to Mrs. C. Berjaud, IRAM Grenoble
(e--mail: {\tt berjaud\mbox{@}iram.fr}).

\signed{
%\htmladdnormallink{Clemens Thum}{mailto:thum@iram.fr},
%\htmladdnormallink{Rainer Mauersberger}{mailto:mauers@iram.es}}
Clemens Thum  \& Carsten Kramer}
%\end{document}
